; HELP/FTP/USER.HLP
; XROUTER FTP SERVER HELP FILE
; Last Modified 17/12/02
;

Command:
   USER  (User name)

Synopsis:
   Specifies user's callsign for login purposes.

Syntax:
   USER <username>

Description:
   The argument to the USER command is a string of up to 8 characters
   specifying the user's login name.  The string may not contain spaces.

   Users are not allowed access to the system without logging in.

   The command must be immediately followed by the PASS command.

Examples:
   USER G6YTR   Enters your callsign as "G6YTR"

See also:
   PASS   Specify your password.
