; File: users.hlp      XROUTER HELP       Last modified: 14/6/00
;
The USERS command, usually abbreviated to "U", displays the circuits 
which originate or terminate at the router.  "Through" connections are 
not shown.

Established circuits are shown by <-->  and circuits being set up are 
shown thus:  <~~>.

UPLINK is a connection from a user (who may be located at another 
node) to the router, and DOWNLINK is a connection from the router to a 
user.  Uplink/downlink types may be L2 (ax25 level 2), L4 (ax25 level 
4), TCP (TCP/IP), CON (console), TTY (remote console).

