; HELP/FTP/USER.HLP
; G8PZT BBS FTP SERVER HELP FILE
; Last Modified 26/1/99
;

Command:
   USER  (User name)        { FTP server command }

Synopsis:
   Specifies user's name for login purposes.

Syntax:
   USER <username>

Description:
   The argument to the USER command is a string of up to 8 characters
   specifying the user's login name.  The string may not contain spaces.

   Users are not allowed access to the system without logging in.

   The command must be immediately followed by the PASS command.

Examples:
   USER GUEST   Enters your login name as "GUEST"

See also:
   PASS   Specify your password.
