; HELP/FTP/PWD.HLP
; G8PZT BBS FTP SERVER HELP FILE
; Last Modified 26/1/99
;
Command:
   PWD (Print Working Directory)

Synopsis:
   Displays directory name currently logged at the FTP server.

Syntax:
   PWD

Description:
   The PWD command causes the full path of the FTP server's current
   working directory to be displayed via the control connection.

See also:
   CWD  (Change Working Directory)

