; HELP/FTP/PASS.HLP
; G8PZT BBS FTP SERVER HELP FILE
; Last Modified 26/1/99
;

Synopsis:
   The PASS (PASSword) command specifies user password at login.

Syntax:
   PASS <password>

Description:
   The argument to the PASS command is a string of up to 8 characters
   specifying the user's password.  The string may not contain spaces.

   The command must be immediately preceeded by the USER command.

Examples:
   PASS WATER   Enters your password as "WATER"

Notes:
   Some usernames, e.g. ANON and GUEST may accept any password if the
   sysop has set up the system to do so.  In this case it is customary
   to give your callsign as the password.

See also:
   USER   Specify your username.
