; HELP/FTP/CWD.HLP
; XROUTER FTP SERVER HELP FILE
; Last Modified 17/12/02
;
CWD changes the current working directory on the FTP server.

SYNTAX: CWD <pathname>

The server accepts both UNIX (e.g. pub/files) and DOS (e.g. pub\files)
pathname conventions, and is not case sensitive.

EXAMPLES:
        CWD FRED        Change to subdirectory FRED of current directory
        CWD ..          Change up one level to parent directory
        CWD /           Change to root directory
        CWD /FRED/JIM   Change to JIM subdirectory of FRED directory.

See also:
   CDUP   Change up one directory