; HELP/FTP/CDUP.HLP
; G8PZT BBS FTP SERVER HELP FILE
; Last Modified: 26/1/99
;
The CDUP command changes the current working directory up one level to
the parent directory, i.e. it performs the function of "CWD .."

This command has no arguments, and if already at the root it has no effect.

See also:
   CWD   Change Working Directory

